al-ʿĀḍid bi-Allāh (Abū Muḥammad ʿAbd Allāh ibn al-Mawlā Abī l-Ḥajjāj Yūsuf ibn al-Imām al-Ḥāfiẓ li-Dīn Allāh) — العاضد بالله أبو محمد عبد الله بن المولى أبي الحجاج يوسف بن الإمام الحافظ لدين الله
edition published: 2021-06-23+02:00
language: syr; syr-Syrj; syr-Syrn; en; en-x-gedsh; ar; fr; de
availability: Distributed under a Creative Commons Attribution 4.0 International (CC BY 4.0) License. (https://creativecommons.org/licenses/by/4.0/)

al-ʿĀḍid bi-Allāh (Abū Muḥammad ʿAbd Allāh ibn al-Mawlā Abī l-Ḥajjāj Yūsuf ibn al-Imām al-Ḥāfiẓ li-Dīn Allāh); العاضد بالله أبو محمد عبد الله بن المولى أبي الحجاج يوسف بن الإمام الحافظ لدين الله
al-ʿĀḍid bi-Allāh (Abū Muḥammad ʿAbd Allāh ibn al-Mawlā Abī l-Ḥajjāj Yūsuf ibn al-Imām al-Ḥāfiẓ li-Dīn Allāh), last Fatimid caliph of Egypt (d. 567/1171)
identifier: https://usaybia.net/person/399
state: caliph
Muslim
Muslim
A literary history of medicine: the 'Uyūn al-anbā' fī ṭabaqāt al-aṭibbā' of Ibn Abī Uṣaybi'ah 14.31.6