Mūsā ibn Maymūn, Moses Maimonides, Abū ʿImrān al-Qurṭubī — الرئيس موسى
edition published: 2021-06-23+02:00
language: syr; syr-Syrj; syr-Syrn; en; en-x-gedsh; ar; fr; de
availability: Distributed under a Creative Commons Attribution 4.0 International (CC BY 4.0) License. (https://creativecommons.org/licenses/by/4.0/)

Mūsā ibn Maymūn, Moses Maimonides, Abū ʿImrān al-Qurṭubī; الرئيس موسى بن ميمون القرطبي; al-Raʾīs Mūsā ibn Maymūn (Maimonides); الرئيس موسى; موسى بن ميمون أبو عمران القرطبي
Mūsā ibn Maymūn, Moses Maimonides, Abū ʿImrān al-Qurṭubī (527–606/1135–1208) Jewish theologian, philosopher and physician
identifier: https://usaybia.net/person/1678
identifier: https://ar.wikipedia.org/wiki/%D9%85%D9%88%D8%B3%D9%89_%D8%A8%D9%86_%D9%85%D9%8A%D9%85%D9%88%D9%86
identifier: https://viaf.org/viaf/100185495
identifier: https://dx.doi.org/10.1163/1573-3912_islam_SIM_3293
identifier: https://plato.stanford.edu/entries/maimonides/
state: theologian
state: philosopher
state: physician
Jewish
A literary history of medicine: the 'Uyūn al-anbā' fī ṭabaqāt al-aṭibbā' of Ibn Abī Uṣaybi'ah 14.39 14.38.1n 14.40.1n 15.40.3 15.51.1
عيون الأنباء في طبقات الأطباء