al-Malik al-Muʿaẓẓam Sharaf al-Dīn ʿĪsā ibn al-Malik al-ʿĀdil Ⅰ — الملك المعظم شرف الدين عيسى بن الملك العادل الواحد
edition published: 2021-06-23+02:00
language: syr; syr-Syrj; syr-Syrn; en; en-x-gedsh; ar; fr; de
availability: Distributed under a Creative Commons Attribution 4.0 International (CC BY 4.0) License. (https://creativecommons.org/licenses/by/4.0/)

al-Malik al-Muʿaẓẓam Sharaf al-Dīn ʿĪsā ibn al-Malik al-ʿĀdil Ⅰ; المالك المعظم عيسى ابن المالك العادل; الملك المعظم شرف الدين عيسى بن الملك العادل الواحد
al-Malik al-Muʿaẓẓam Sharaf al-Dīn ʿĪsā ibn al-Malik al-ʿĀdil Ⅰ, Ayyubid ruler of Damascus (576–624/1180–1227)
identifier: https://usaybia.net/person/1479
identifier: https://ar.wikipedia.org/wiki/%D8%A7%D9%84%D9%85%D8%B9%D8%B8%D9%85_%D8%B9%D9%8A%D8%B3%D9%89_%D8%A8%D9%86_%D8%A7%D9%84%D8%B9%D8%A7%D8%AF%D9%84
identifier: https://viaf.org/viaf/1634149844942602960006
state: ruler
Muslim
A literary history of medicine: the 'Uyūn al-anbā' fī ṭabaqāt al-aṭibbā' of Ibn Abī Uṣaybi'ah 14.50 14.53 14.56.1 15.19 15.22 15.29 15.36.1 15.43.1 15.43.3 15.45.2 15.45.3 no. 1 15.50.3 15.51
عيون الأنباء في طبقات الأطباء